// Copyright (C) 2019-2022 Intel Corporation
// Copyright (C) 2022-2023 CVAT.ai Corporation
//
// SPDX-License-Identifier: MIT

import React from 'react';

const UNDEFINED_ATTRIBUTE_VALUE = '__undefined__';
const NO_BREAK_SPACE = '\u00a0';
const CHANGELOG_URL = 'https://github.com/opencv/cvat/blob/develop/CHANGELOG.md';
const LICENSE_URL = 'https://github.com/opencv/cvat/blob/develop/LICENSE';
const GITTER_URL = 'https://gitter.im/opencv-cvat';
const DISCORD_URL = 'https://discord.gg/fNR3eXfk6C';
const GITHUB_URL = 'https://github.com/opencv/cvat';
const GITHUB_IMAGE_URL = 'https://github.com/opencv/cvat/raw/develop/site/content/en/images/cvat.jpg';
const GUIDE_URL = 'https://opencv.github.io/cvat/docs';
const UPGRADE_GUIDE_URL = 'https://opencv.github.io/cvat/docs/administration/advanced/upgrade_guide';
const SHARE_MOUNT_GUIDE_URL =
    'https://opencv.github.io/cvat/docs/administration/basics/installation/#share-path';
const NUCLIO_GUIDE =
    'https://opencv.github.io/cvat//docs/administration/advanced/installation_automatic_annotation/';
const DATASET_MANIFEST_GUIDE_URL = 'https://opencv.github.io/cvat/docs/manual/advanced/dataset_manifest/';
const CANVAS_BACKGROUND_COLORS = ['#ffffff', '#f1f1f1', '#e5e5e5', '#d8d8d8', '#CCCCCC', '#B3B3B3', '#999999'];
const NEW_LABEL_COLOR = '#b3b3b3';
const LATEST_COMMENTS_SHOWN_QUICK_ISSUE = 3;
const QUICK_ISSUE_INCORRECT_POSITION_TEXT = 'Wrong position';
const QUICK_ISSUE_INCORRECT_ATTRIBUTE_TEXT = 'Wrong attribute';
const DEFAULT_PROJECT_SUBSETS = ['Train', 'Test', 'Validation'];
const CANVAS_WORKSPACE_ROWS = 12;
const CANVAS_WORKSPACE_COLS = 12;
const CANVAS_WORKSPACE_MARGIN = 8;
const CANVAS_WORKSPACE_PADDING = CANVAS_WORKSPACE_MARGIN / 2;
const OUTSIDE_PIC_URL = 'https://opencv.github.io/cvat/images/image019.jpg';
const DEFAULT_AWS_S3_REGIONS: string[][] = [
    ['us-east-1', 'US East (N. Virginia)'],
    ['us-east-2', 'US East (Ohio)'],
    ['us-west-1', 'US West (N. California)'],
    ['us-west-2', 'US West (Oregon)'],
    ['ap-south-1', 'Asia Pacific (Mumbai)'],
    ['ap-northeast-1', 'Asia Pacific (Tokyo)'],
    ['ap-northeast-2', 'Asia Pacific (Seoul)'],
    ['ap-northeast-3', 'Asia Pacific (Osaka)'],
    ['ap-southeast-1', 'Asia Pacific (Singapore)'],
    ['ap-southeast-2', 'Asia Pacific (Sydney)'],
    ['ca-central-1', 'Canada (Central)'],
    ['eu-central-1', 'EU (Frankfurt)'],
    ['eu-west-1', 'Europe (Ireland)'],
    ['eu-west-2', 'Europe (London)'],
    ['eu-west-3', 'Europe (Paris)'],
    ['eu-north-1', 'Europe (Stockholm)'],
    ['sa-east-1', 'South America (São Paulo)'],
];

const SERVER_UNAVAILABLE_COMPONENT = (
    <>
        Make sure the CVAT backend and all necessary services
        (Database, Redis and Open Policy Agent) are running and avaliable.
        If you upgraded from version 2.2.0 or earlier, manual actions may be needed,
        see the&nbsp;
        <a
            target='_blank'
            rel='noopener noreferrer'
            href={UPGRADE_GUIDE_URL}
        >
            Upgrade Guide
        </a>
        .
    </>
);

const DEFAULT_GOOGLE_CLOUD_STORAGE_LOCATIONS: string[][] = [
    ['NORTHAMERICA-NORTHEAST1', 'Montréal'],
    ['NORTHAMERICA-NORTHEAST2', 'Toronto'],
    ['US-CENTRAL1', 'Iowa'],
    ['US-EAST1', 'South Carolina'],
    ['US-EAST4', 'Northern Virginia'],
    ['US-WEST1', 'Oregon'],
    ['US-WEST2', 'Los Angeles'],
    ['US-WEST3', 'Salt Lake City'],
    ['US-WEST4', 'Las Vegas'],
    ['SOUTHAMERICA-EAST1', 'São Paulo'],
    ['EUROPE-CENTRAL2', 'Warsaw'],
    ['EUROPE-NORTH1', 'Finland'],
    ['EUROPE-WEST1', 'Belgium'],
    ['EUROPE-WEST2', 'London'],
    ['EUROPE-WEST3', 'Frankfurt'],
    ['EUROPE-WEST4', 'Netherlands'],
    ['EUROPE-WEST6', 'Zürich'],
    ['ASIA-EAST1', 'Taiwan'],
    ['ASIA-EAST2', 'Hong Kong'],
    ['ASIA-NORTHEAST1', 'Tokyo'],
    ['ASIA-NORTHEAST2', 'Osaka'],
    ['ASIA-NORTHEAST3', 'Seoul'],
    ['ASIA-SOUTH1', 'Mumbai'],
    ['ASIA-SOUTH2', 'Delhi'],
    ['ASIA-SOUTHEAST1', 'Singapore'],
    ['ASIA-SOUTHEAST2', 'Jakarta'],
    ['AUSTRALIA-SOUTHEAST1', 'Sydney'],
    ['AUSTRALIA-SOUTHEAST2', 'Melbourne'],
    // Multi-regions
    ['ASIA', 'Data centers in Asia'],
    ['EU', 'Data centers within member states of the European Union'],
    ['US', 'Data centers in the United States'],
    // Dual-regions
    ['ASIA1', 'ASIA-NORTHEAST1 and ASIA-NORTHEAST2'],
    ['EUR4', 'EUROPE-NORTH1 and EUROPE-WEST4'],
    ['NAM4', 'US-CENTRAL1 and US-EAST1'],
];

const HEALTH_CHECK_RETRIES = 10;
const HEALTH_CHECK_PERIOD = 3000; // ms
const HEALTH_CHECK_REQUEST_TIMEOUT = 5000; // ms

export default {
    UNDEFINED_ATTRIBUTE_VALUE,
    NO_BREAK_SPACE,
    CHANGELOG_URL,
    LICENSE_URL,
    GITTER_URL,
    DISCORD_URL,
    GITHUB_URL,
    GITHUB_IMAGE_URL,
    GUIDE_URL,
    UPGRADE_GUIDE_URL,
    SHARE_MOUNT_GUIDE_URL,
    CANVAS_BACKGROUND_COLORS,
    NEW_LABEL_COLOR,
    NUCLIO_GUIDE,
    LATEST_COMMENTS_SHOWN_QUICK_ISSUE,
    QUICK_ISSUE_INCORRECT_POSITION_TEXT,
    QUICK_ISSUE_INCORRECT_ATTRIBUTE_TEXT,
    DEFAULT_PROJECT_SUBSETS,
    DEFAULT_AWS_S3_REGIONS,
    DEFAULT_GOOGLE_CLOUD_STORAGE_LOCATIONS,
    OUTSIDE_PIC_URL,
    DATASET_MANIFEST_GUIDE_URL,
    HEALTH_CHECK_RETRIES,
    HEALTH_CHECK_PERIOD,
    HEALTH_CHECK_REQUEST_TIMEOUT,
    SERVER_UNAVAILABLE_COMPONENT,
    CANVAS_WORKSPACE_ROWS,
    CANVAS_WORKSPACE_COLS,
    CANVAS_WORKSPACE_MARGIN,
    CANVAS_WORKSPACE_PADDING,
};
